From 0f0aa2c17e09f9b813ab3469b1b0aced5f2e7541 Mon Sep 17 00:00:00 2001
From: Matthias Vogelgesang <matthias.vogelgesang@gmail.com>
Date: Mon, 6 Aug 2012 12:14:06 +0200
Subject: Remove superfluous libufodecode section

---
 admin.tex | 9 ---------
 1 file changed, 9 deletions(-)

(limited to 'admin.tex')

diff --git a/admin.tex b/admin.tex
index 5bd8671..3afd46b 100644
--- a/admin.tex
+++ b/admin.tex
@@ -44,21 +44,12 @@ make
 make install
 \end{verbatim}
 
-
 In case of problems it is possible to disable SSE support, in this case cmake should be run with \verb/HAVE_SSE=OFF/ parameter
 \begin{verbatim}
 cmake -D "HAVE_SSE=OFF" .
 \end{verbatim}
 
 
-\subsection{Camera format decoder -- libufdecode}
-\begin{verbatim}
-cmake .
-make 
-make install
-\end{verbatim}
-
-
 \subsection{Camera driver -- pcitool}
 The building of pcitool consists of 3 steps. The pcitool userspace may be simply installed with cmake as other applications.
 \begin{verbatim}
-- 
cgit v1.2.3

